0˚ 30˚ 60˚ 90˚ 120˚ 150˚ 180˚ 210˚ 240˚ 270˚ 300˚ 330˚ 0˚

-60˚

-30˚

0˚

30˚

60˚

0 5 10 15 20 25 30 35 40 45 50 55 60 65 70 75 80 85 90 95 100

Spreading half-rate [mm/yr]